ALTER TABLE `zone` ADD `fast_regen_hp` INT NOT NULL DEFAULT '180';
ALTER TABLE `zone` ADD `fast_regen_mana` INT NOT NULL DEFAULT '180';
ALTER TABLE `zone` ADD `fast_regen_endurance` INT NOT NULL DEFAULT '180';
