INSERT INTO `rule_values` VALUES (1, 'Pathing:Aggro', 'true', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:AggroReturnToGrid', 'true', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:CandidateNodeRangeXY', '400.000000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:CandidateNodeRangeZ', '10.0000000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:CullNodesFromEnd', '1', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:CullNodesFromStart', '1', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:Fear', 'true', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:Find', 'true', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:Guard', 'true', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:LOSCheckFrequency', '1000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:MaxNodesLeftForLOSCheck', '4', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:MinDistanceForLOSCheckLong', '1000000.00', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:MinDistanceForLOSCheckShort', '40000.0000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:MinNodesTraversedForLOSCheck', '3', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:RouteUpdateFrequencyLong', '5000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:RouteUpdateFrequencyNodeCount', '5', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:RouteUpdateFrequencyShort', '1000', '');
INSERT INTO `rule_values` VALUES (1, 'Pathing:ZDiffThreshold', '10.0000000', '');
INSERT INTO `rule_values` VALUES (1, 'Map:FindBestZHeightAdjust', '1', '');
INSERT INTO `rule_values` VALUES (1, 'Map:UseClosestZ', 'false', '');
