ALTER TABLE `faction_list` ADD COLUMN `mod_c16` smallint(6) NOT NULL default '0' AFTER `mod_c15`;
ALTER TABLE `faction_list` ADD COLUMN `mod_r330` smallint(6) NOT NULL default '0' AFTER `mod_r161`;